VERSION 1.0 CLASS
BEGIN
  MultiUse = -1  'True
  Persistable = 0  'NotPersistable
  DataBindingBehavior = 0  'vbNone
  DataSourceBehavior  = 0  'vbNone
  MTSTransactionMode  = 0  'NotAnMTSObject
END
Attribute VB_Name = "CBase64"
Attribute VB_GlobalNameSpace = False
Attribute VB_Creatable = True
Attribute VB_PredeclaredId = False
Attribute VB_Exposed = False
Public Function EncodeBase64(ByRef arrData() As Byte) As String
    Dim objXML As MSXML2.DOMDocument
    Dim objNode As MSXML2.IXMLDOMElement

    ' help from MSXML
    Set objXML = New MSXML2.DOMDocument
    ' byte array to base64
    Set objNode = objXML.createElement("b64")
    objNode.dataType = "bin.base64"
    objNode.nodeTypedValue = arrData
    EncodeBase64 = objNode.Text
    ' thanks, bye
    Set objNode = Nothing
    Set objXML = Nothing
End Function

Public Function DecodeBase64(ByVal strData As String) As Byte()
    Dim objXML As MSXML2.DOMDocument
    Dim objNode As MSXML2.IXMLDOMElement

    ' help from MSXML
    Set objXML = New MSXML2.DOMDocument
    Set objNode = objXML.createElement("b64")
    objNode.dataType = "bin.base64"
    objNode.Text = strData
    DecodeBase64 = objNode.nodeTypedValue
    ' thanks, bye
    Set objNode = Nothing
    Set objXML = Nothing
End Function

